%%
%% This is file `prshowbox.def',
%% generated with the docstrip utility.
%%
%% The original source files were:
%%
%% preview.dtx  (with options: `showbox')
%% 
%% IMPORTANT NOTICE:
%% 
%% For the copyright see the source file.
%% 
%% Any modified versions of this file must be renamed
%% with new filenames distinct from prshowbox.def.
%% 
%% For distribution of the original source see the terms
%% for copying and modification in the file preview.dtx.
%% 
%% This generated file may be distributed as long as the
%% original source files, as listed above, are part of the
%% same distribution. (The sources need not necessarily be
%% in the same archive or directory.)
%%    The preview style for extracting previews from LaTeX documents.
%%    Developed as part of AUCTeX <URL:http://www.gnu.org/software/auctex>.
\ifPreview\else\expandafter\endinput\fi
\AtEndOfPackage{%
  \showboxbreadth\maxdimen
  \showboxdepth\maxdimen}
\g@addto@macro\pr@ship@end{\showbox\pr@box}
\endinput
%%
%% End of file `prshowbox.def'.
